
export const QUALIDADES_ACO = [
  'ASTM A36',
  'ASTM A572 Gr 50',
  'ASTM A588',
  'ASTM A992',
  'SAE 1020',
  'SAE 1045', 
  'AISI 304',
  'AISI 316',
  'AISI 430',
  'ABNT NBR 7007',
  'ABNT NBR 8800',
  'DIN 17100 St37',
  'DIN 17100 St52',
  'EN 10025 S235',
  'EN 10025 S275',
  'EN 10025 S355'
];

export const getQualidadeAcoOptions = () => QUALIDADES_ACO;
